;------------------------------------------------------------
; LIBXINEUTILS DLL DEFINITIONS FILE

EXPORTS

xine_fast_memcpy
xine_probe_fast_memcpy

xine_mm_accel

;xine_profiler_init
;xine_profiler_allocate_slot
;xine_profiler_start_count
;xine_profiler_stop_count
;xine_profiler_print_results

xine_xmalloc

xine_xmalloc_aligned
xine_get_homedir

xine_print_trace

xine_chomp
xine_usec_sleep

xine_profiler_stop_count
xine_profiler_start_count
xine_profiler_allocate_slot

xine_list_new
xine_list_first_content
xine_list_next_content
xine_list_append_content
xine_list_append_priority_content
xine_list_delete_current
xine_list_free

init_yuv_conversion

xml_parser_free_tree
xml_parser_build_tree
xml_parser_init